O ut si de W orl d

172 .16 .1 14. X

172 .16 .1 13. X

AF RL/S NHS TES T NET WO RK

172 .16 112. X

172 .16 .1 14. 50

172 .16 .1 13. 50

172 .16 .1 12. 50

172 .16 .1 18. X

172 .16 .1 21. X

172 .16 .1 22. X

172 .16 .1 23. X

172 .16 .1 24. X

172 .16 .1 24. X

Solaris

SunOS

Linux

AIX

HP

SunOS

Solaris

Monitored

Domain

Unmonitored

Domain